<template>
  <contact-us />
  <iframe
      src="https://www.google.com/maps/embed?pb=!1m14!1m12!1m3!1d160.87512165223046!2d18.205641416752258!3d49.82362861573854!2m3!1f0!2f0!3f0!3m2!1i1024!2i768!4f13.1!5e0!3m2!1scs!2scz!4v1739304600235!5m2!1scs!2scz"
      width="100%" height="500"
      style="border:0;"
      loading="lazy"
      referrerpolicy="no-referrer-when-downgrade"
  />
</template>
<script setup lang="ts">
import './assets/css/main.css'

</script>